ALTER TABLE "siloAdjustments" RENAME COLUMN "lsiloAdjust_id" TO "siloAdjust_id";--> statement-breakpoint
ALTER TABLE "printerData" ALTER COLUMN "printDelay" SET DEFAULT '90';