ALTER TABLE "printer_data" ALTER COLUMN "port" SET DATA TYPE integer;--> statement-breakpoint
ALTER TABLE "printer_data" ALTER COLUMN "printDelay" SET DATA TYPE integer;--> statement-breakpoint
ALTER TABLE "printer_data" ALTER COLUMN "printDelay" SET DEFAULT 90;